Front Panel

5.00

Seconds

1000000.0

0.11.919.3

193.0

1929.8

19297.6

192975.7

6 40

668578.00

1000000.0

0.11.919.2

191.8

1917.5

19175.5

191754.6

6 40750936.68

19.80

19.82

19.83

19.85

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 8 / 9 7 ghs- 8 0 0 - 1 3 5 0 - 5 0 Set_9la7202la7206la5419la7205la7191la7230la7242la7227

01234678