Front Panel

5.00

Seconds

100000000.0

0.00.219.3

1935.0

193498.5

5 70

1504469.70

1000000.0

0.11.818.1

180.8

1807.7

18076.6

180766.4

5 70440569.64

5.15

5.16

5.18

5.20

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 0 9 / 9 7 GHS-7�00- 1 3 0 0 - 5 0 Set_7lb2393lb1311lb1391la7233la7198la5459la7232la7212

01234678