Front Panel

5.00

Seconds

100000000.0

0.00.219.8

1980.6

198059.0

5 30

2011369.70

100000000.0

0.00.219.7

1973.6

197355.4

5 301345794.46

5.02

5.03

5.05

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 0 8 / 9 7 GHS- 7 0 0 - 1 2 0 0 - 5 0 Set_5lb2673lb2613lb2639lb2644lb2338lb1896lb2336lb2337

01234678