Front Panel

5.00

Seconds

10.0

0.10.22.07 50

0.00

1.00.10.27 50.00

5.03

5.05

5.07

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:8 / 2 3 / 9 7 j p f - 7 0 0 - 1 2 0 0 - 5 0 Set_44 lb2780lb2475

01234678