Front Panel

5.00

Seconds

1000000.0

0.12.019.9

198.7

1987.3

19872.8

198728.1

9 20

446031.19

1000000.0

0.12.019.8

197.9

1979.0

19790.2

197902.2

9 20425778.28

5.03

5.05

5.07

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:8 / 2 2 / 9 7 r s - 7 0 0 - 1 3 0 0 - 5 0 Set_42lb2779 lb2752 lb2760 lb2762lb2772lb2736lb2739lb2771

01234678