Front Panel

5.00

Seconds

1000000.0

0.12.019.9

199.3

1992.8

19928.3

199282.6

9 20

293291.02

1000000.0

0.12.019.7

197.4

1973.6

19735.5

197355.4

9 20135423.89

5.03

5.05

5.07

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:8 / 2 2 / 9 7 r s - 7 0 0 - 1 3 0 0 - 5 0 Set_41lb2744 lb2745 lb2751 lb2726lb2708lb2695lb2685lb2735

01234678