Front Panel

5.00

Seconds

1000000.0

0.12.019.9

198.7

1987.3

19872.8

198728.1

7 30

385070.40

100000.0

0.12.019.7

197.3

1973.2

19731.6

7 3095258.60

5.02

5.05

5.07

5.08

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:8 / 2 2 / 9 7 r s - 7 0 0 - 1 2 0 0 - 5 0 Set_40lb2640 lb2651 lb2669 lb2670lb2978lb2863lb2975lb2878

01234678