Front Panel

5.00

Seconds

100000000.0

0.00.219.9

1987.7

198767.6

3 70

2196520.94

100000000.0

0.00.219.7

1974.3

197433.4

3 701498539.08

5.02

5.03

5.05

5.08

5.12

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 0 8 / 9 7 GHS- 7 0 0 - 1 2 0 0 - 5 0 Set_4lb2462lb2399lb2544lb2396lb2118lb2129lb2390lb2384

01234678