Front Panel

5.00

Seconds

1000000.0

0.12.019.8

198.1

1980.6

19805.9

198059.0

7 40

110801.03

1000000.0

0.12.019.7

197.4

1974.3

19743.3

197433.4

7 40126185.90

5.02

5.03

5.05

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:8 / 2 2 / 9 7 sp - 7 0 0 - 1 2 0 0 - 5 0 Set_39 lb2876 lb2859 lb2848 lb2832 lb2828 lb2821 lb2809 lb2811

01234678