Front Panel

5.00

Seconds

1000000.0

0.12.019.9

198.7

1987.3

19872.8

198728.1

7 40

41863.79

100000000.0

0.00.219.7

1973.9

197394.4

7 401449909.72

5.02

5.03

5.05

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:8 / 2 2 / 9 7 s p - r s - j p f - 7 0 0 - 1 2 0 0 - 5 0 Set_38lb3033lb2814lb2819lb2774lb2775lb2776lb2796lb2805

01234678