Front Panel

5.00

Seconds

100000000.0

0.00.219.9

1993.2

199322.3

6 60

0.00

100000000.0

0.00.219.7

1974.3

197433.4

6 60.00

5.08

5.10

5.12

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 1 8 / 9 7 RWL- 8 0 0 - 1 4 0 0 - 5 0 Set_37la4966zh1934lb2099la7210

01234678