Front Panel

5.00

Seconds

10000000.0

10.0

212.6

2126.4

21263.9

212639.1

2126391.1

6 50

2440717.48

100000000.0

0.00.219.7

1974.3

197433.4

6 501539845.18

5.02

5.03

5.05

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 1 8 / 9 7 RWL- 8 0 0 - 1 4 0 0 - 5 0 Set_36la2657la4590la5270zh1936zh1933lb2145lb2143zh1939

01234678