Front Panel

5.00

Seconds

1000000.0

0.12.019.9

198.7

1987.3

19872.8

198728.1

6 50

2989769.15

10000000.0

100.0

459.1

4591.4

45913.9

459139.4

6 502377516.33

5.02

5.03

5.05

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 1 8 / 9 7 RWL- 8 0 0 - 1 4 0 0 - 5 0 Set_35la7170la7207la7199la5357la5260la5351zh1942la5108

01234678