Front Panel

5.00

Seconds

100000000.0

0.00.219.9

1987.7

198767.6

6 50

3140329.71

100000000.0

0.00.219.7

1973.9

197394.4

6 502624810.66

5.03

5.05

5.07

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 1 8 / 9 7 RWL- 8 0 0 - 1 4 0 0 - 5 0 Set_34la5253la7195la2604la5422la5348la7154lb2141la8805

01234678