Front Panel

5.00

Seconds

100000000.0

0.00.439.7

3974.6

397456.3

6 60

185951.11

100000000.0

0.00.219.8

1979.8

197980.6

6 602493529.30

5.02

5.04

5.05

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 1 7 / 9 7 r s - 8 0 0 - 1 4 0 0 - 5 0 Set_33la5246la8808la7183la7214lb1620la5164la5437la7201

01234678