Front Panel

5.00

Seconds

100000000.0

0.00.219.4

1941.4

194137.1

6 50

1367528.81

100000000.0

0.00.219.3

1929.0

192901.2

6 502665892.30

5.02

5.03

5.05

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 1 7 / 9 7 r s - 8 0 0 - 1 4 0 0 - 5 0 Set_32la7217la7228lb2220la5129la2924la5229la3044la7203

01234678