Front Panel

5.00

Seconds

100000000.0

0.00.219.9

1986.1

198609.7

6 60

2181941.00

100000000.0

0.00.219.7

1973.2

197316.5

6 602026811.52

5.02

5.03

5.05

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 1 7 / 9 7 r s - 8 0 0 - 1 4 0 0 - 5 0 Set_31la7239lb2140la2580la7225lb0914la5453lb0952la7192

01234678