Front Panel

5.00

Seconds

100000000.0

0.00.219.9

1987.3

198728.1

6 50

1337346.34

1000000.0

0.12.019.8

198.0

1979.8

19798.1

197980.6

6 50707764.36

5.02

5.03

5.05

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 1 7 / 9 7 r s - 8 0 0 - 1 4 0 0 - 5 0 Set_30la5345zh1855la7222la8820la5166zh1930lb0958la7246

01234678