Front Panel

5.00

Seconds

100000000.0

0.00.219.9

1986.1

198609.7

5 70

3066659.60

100000000.0

0.00.219.7

1974.3

197433.4

5 702293141.39

5.02

5.03

5.05

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 7 / 9 7 JPF- 7 0 0 - 1 2 0 0 - 5 0 Set_3lb2623lb2591lb2614lb2387lb2400lb2403lb2408lb2681

01234678