Front Panel

5.00

Seconds

10000000.0

1.023.8

238.5

2384.7

23847.4

238473.8

6 40

2162181.60

10000000.0

10.0

211.2

2112.1

21121.2

211212.0

2112120.0

6 401635454.60

5.03

5.05

5.07

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 1 6 / 9 7 RWL- 8 0 0 - 1 4 0 0 - 5 0 Set_29la5324zh1948la5349la5252la7224zh1861lb1616zh1870

01234678