Front Panel

5.00

Seconds

100000000.0

0.00.219.9

1992.0

199203.2

6 40

1588709.04

10000000.0

10.0

326.7

3267.3

32673.3

326732.7

6 401484771.42

5.03

5.05

5.07

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 1 6 / 9 7 RWL- 8 0 0 - 1 4 0 0 - 5 0 Set_28la7184lb2139la5261la7169lb0913lb1260la8827zh1873

01234678