Front Panel

5.00

Seconds

100000000.0

0.00.219.9

1992.8

199282.6

6 40

2153231.84

100000000.0

0.00.219.8

1979.4

197941.4

6 40445203.92

5.02

5.03

5.05

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 1 6 / 9 7 RWL- 8 0 0 - 1 4 0 0 - 5 0 Set_27lb2229la5258la5156lb0939lb2215la7231lb2097lb2176

01234678