Front Panel

5.00

Seconds

100000000.0

0.00.219.9

1986.5

198649.2

6 40

442097.59

100000000.0

0.00.219.7

1973.6

197355.4

6 402312086.50

5.02

5.04

5.05

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 1 5 / 9 7 r s - 8 0 0 - 1 4 0 0 - 5 0 Set_26la5335lb2180la5123la8793lb0922la5363la8787zh1859

01234678