Front Panel

5.00

Seconds

100000000.0

0.00.219.9

1987.7

198767.6

6 40

218659.70

100000000.0

0.00.219.8

1979.0

197902.2

6 402653835.54

5.03

5.05

5.12

5.13

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 1 5 / 9 7 r s - 8 0 0 - 1 4 0 0 - 5 0 Set_25la5382la7180zh1940la5149la5331la5354la5461la5858

01234678