Front Panel

5.00

Seconds

10000000.0

0.10.66.059.8

598.0

5979.7

59796.7

597966.9

6 60

2817202.57

100000000.0

0.00.219.7

1967.7

196772.9

6 602330098.22

5.02

5.03

5.05

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 1 5 / 9 7 JPF- 8 0 0 - 1 4 0 0 - 5 0 Set_24la5152la5296la5447la7179la5163la5356zh1868la7211

01234678