Front Panel

5.00

Seconds

100000.0

0.12.019.9

198.7

1987.3

19872.8

5 60

1239362.30

10000.0

0.12.019.8

198.0

1980.2

5 604076.82

5.02

5.03

5.05

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 1 5 / 9 7 JPF- 8 0 0 - 1 3 0 0 - 5 0 Set_23la7260zh1946lb0885la5320zh1949la7238lb2231lb2212

01234678