Front Panel

5.00

Seconds

100000000.0

0.00.219.9

1987.7

198767.6

6 40

1619912.34

100000000.0

0.00.219.7

1973.9

197394.4

6 401013502.67

5.03

5.05

5.07

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 1 4 / 9 7 RWL- 8 0 0 - 1 4 0 0 - 5 0 Set_22zh1938la5170la5208la5125lb2248lb0968lb0964zh1944

01234678