Front Panel

5.00

Seconds

1000000.0

0.12.019.9

198.7

1987.3

19872.8

198728.1

6 50

1817258.26

10000000.0

1.025.7

257.3

2573.2

25732.4

257323.8

6 501512849.40

5.02

5.04

5.05

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 1 4 / 9 7 RWL- 8 0 0 - 1 4 0 0 - 5 0 Set_21lb0941la7216la5284lb0951la5322la5315la5283la5209

01234678