Front Panel

5.00

Seconds

100000000.0

0.00.219.9

1986.9

198688.7

6 40

429230.85

10000000.0

1.07.575.0

750.2

7502.5

75024.7

750246.8

6 403120296.38

5.02

5.03

5.05

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 1 4 / 9 7 RWL- 8 0 0 - 1 4 0 0 - 5 0 Set_20la8794la7215la8831zh1947la6073lb1681lb2208la5172

01234678