Front Panel

5.00

Seconds

100000000.0

0.00.219.9

1993.2

199322.3

6 40

2885218.82

10000000.0

0.10.65.959.4

593.9

5939.4

59394.2

593941.8

6 402503588.40

5.03

5.05

5.07

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 1 4 / 9 7 RWL- 8 0 0 - 1 4 0 0 - 5 0 Set_19la5277la5265lb1590lb2226lb2210la6098la5332la5346

01234678