Front Panel

5.00

Seconds

100000000.0

0.00.219.9

1987.3

198728.1

6 50

11667.19

100000.0

0.11.919.4

194.1

1940.6

19406.2

6 5022838.93

5.03

5.05

5.07

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 1 1 / 9 7 r s - 7 0 0 - 1 3 0 0 - 5 0 Set_18la5325la5107la8825la7171la7256la6099la7162la7253

01234678