Front Panel

5.00

Seconds

100000000.0

0.00.219.8

1981.4

198137.5

6 50

156311.68

100000000.0

0.00.219.8

1979.0

197902.2

6 501458770.10

5.02

5.03

5.05

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 1 1 / 9 7 r s - 8 0 0 - 1 4 0 0 - 5 0 Set_17zh1863la7182la7194la7219la6084la7248la5445la7254

01234678