Front Panel

5.00

Seconds

100000000.0

0.00.219.9

1987.7

198767.6

6 50

2284229.06

100000000.0

0.00.219.8

1979.8

197980.6

6 501901326.87

5.02

5.03

5.05

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 1 1 / 9 7 r s - 8 0 0 - 1 4 0 0 - 5 0 Set_16la7257la7262la7220la5460la7172la7236la7243la5391

01234678