Front Panel

5.00

Seconds

100000000.0

0.00.219.9

1992.4

199242.9

6 10

2523576.69

100000000.0

0.00.219.8

1979.4

197941.4

6 103132165.05

5.02

5.04

5.05

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 1 1 / 9 7 ghs- 8 0 0 - 1 4 0 0 - 5 0 Set_15la7221la5421la5367la7208la7244la7249la7252la7255

01234678