Front Panel

5.00

Seconds

100000.0

0.12.019.9

199.2

1992.4

19924.3

6 50

3187054.68

1000000.0

0.12.019.7

197.3

1973.2

19731.6

197316.5

6 50380857.99

5.05

5.07

5.08

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 1 1 / 9 7 ghs- 8 0 0 - 1 4 0 0 - 5 0 Set_14la6088la5420la7241la5416la7178la5444la7240la7156

01234678