Front Panel

5.00

Seconds

100000000.0

0.00.219.9

1993.2

199322.3

7 50

3124.73

1000000.0

0.12.019.7

197.4

1973.9

19739.4

197394.4

7 502236.39

5.02

5.03

5.05

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 1 0 / 9 7 r s - 7 0 0 - 1 4 0 0 - 5 0 Set_13la7189la6081la5353la5470la5458la7223la7185la6086

01234678