Front Panel

5.00

Seconds

1000000.0

0.12.019.9

198.7

1986.9

19868.9

198688.7

6 50

1122951.09

100000000.0

0.00.219.7

1973.9

197394.4

6 5061019.21

5.02

5.03

5.05

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 1 0 / 9 7 r s - 7 0 0 - 1 3 0 0 - 5 0 Set_12la5441la7209la7187la7237la5448la7247la7250la7218

01234678