Front Panel

5.00

Seconds

1000000.0

0.12.019.9

198.7

1987.3

19872.8

198728.1

6 50

1971.10

1000000.0

0.12.019.7

197.4

1973.9

19739.4

197394.4

6 502554.04

5.02

5.04

5.05

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 1 0 / 9 7 r s - 7 0 0 - 1 3 0 0 - 5 0 Set_11la6083la7190la7213la7235la8819la7226la7200la5436

01234678