Front Panel

5.00

Seconds

100000000.0

0.00.219.9

1987.3

198728.1

6 70

3008771.38

100000000.0

0.00.219.8

1979.8

197980.6

6 701989447.35

5.02

5.04

5.05

Tube #

Date

Observer

Start Voltage

End Voltage

Step

TITLE:7 / 7 / 9 7 JPF- 6 0 0 - 1 2 0 0 - 5 0 Set_1lb1577lb2609lb2351lb2324lb2246lb2354lb2360lb2036

01234678