observer@sol Wed May 26 16:21:38 EST 1999

40 60 80 100 120 0 20 40 60 80 100 Voltage: 950 Single pe: 59.1

50 100 150 0

20

40

60

80 Voltage: 1000 Single pe: 69.1

50 100 150 200 0 10 20 30 40 50

Voltage: 1050 Single pe: 81.8

PMT fa0842 Slot: 11 Ch: 5 Gain@1000V: 29.9 Ped: 39 Voltage Settings 0.5 dc/pe : 580 V 1.0 dc/pe : 636 V 1.5 dc/pe : 671 V 2.0 dc/pe : 697 V 2.5 dc/pe : 718 V 3.0 dc/pe : 736 V 3.5 dc/pe : 751 V 4.0 dc/pe : 765 V 850 950 1050 1150

10^1

10^2

fa0842: 7.502332,-21.030745 voltage [V] gain [dc/pe]