observer@sol Wed May 26 16:08:38 EST 1999

50 60 70 80 90 100 0

50

100

150

Voltage: 900 Single pe: 62.3

60 80 100 120 0 20 40 60 80 100 120 Voltage: 950 Single pe: 68.8

60 80 100 120 140 160 0

20

40

60

80 Voltage: 1000 Single pe: 76.5

PMT fa0803 Slot: 11 Ch: 11 Gain@1000V: 27.6 Ped: 49 Voltage Settings 0.5 dc/pe : 563 V 1.0 dc/pe : 622 V 1.5 dc/pe : 659 V 2.0 dc/pe : 686 V 2.5 dc/pe : 709 V 3.0 dc/pe : 728 V 3.5 dc/pe : 744 V 4.0 dc/pe : 758 V 800 900 1000 1100

10^1

10^2

fa0803: 6.981286,-19.502341 voltage [V] gain [dc/pe]